/************************************************/
/*     定时排风表： lab_timed_exhaust    ****/
/*     添加人：cyl                    ****/
/*     添加时间：2023-4-6                 ****/
/************************************************/
CREATE TABLE `lab_timed_exhaust`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键id',
  `task_name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '任务名称',
  `exhaust_period` varchar(5000) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '排风时段，json数据',
  `execution_date_type` tinyint(1) NULL DEFAULT 0 COMMENT '执行日期类型，1是跳过节假日，0不跳过',
  `execution_date` varchar(5000) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行日期时间段，json数据',
  `exhaust_type` tinyint(1) NULL DEFAULT 0 COMMENT '排风状态，1是启动，0是不启动',
  `user_id` bigint(20) NULL DEFAULT NULL COMMENT '创建人（用于数据权限）',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '创建人',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '修改人',
  `update_time` datetime NULL DEFAULT NULL COMMENT '修改时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 51 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '定时排风表' ROW_FORMAT = Dynamic;


/************************************************/
/*     定时排风关联实验室表： lab_timed_exhaust_joinsub    ****/
/*     添加人：cyl                    ****/
/*     添加时间：2023-4-6                 ****/
/************************************************/
CREATE TABLE `lab_timed_exhaust_joinsub`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键id',
  `timed_exhaust_id` bigint(20) NULL DEFAULT NULL COMMENT '定时排风主键',
  `sub_id` bigint(20) NULL DEFAULT NULL COMMENT '实验室id',
  `user_id` bigint(20) NULL DEFAULT NULL COMMENT '创建人（用于数据权限）',
  `create_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '创建人',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '修改人',
  `update_time` datetime NULL DEFAULT NULL COMMENT '修改时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 48 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '定时排风关联实验室表' ROW_FORMAT = Dynamic;

