
# 添加任务
INSERT INTO `sys_job` (`job_id`, `job_name`, `job_group`, `invoke_target`, `cron_expression`, `misfire_policy`, `concurrent`, `status`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (16, '实验室风险指标监测', 'DEFAULT', 'chemicalTask.indicatorMonitoring', '0 0 0/1 * * ?', '1', '1', '1', 'superAdmin', '2022-08-30 10:21:11', '', NULL, '');
