ALTER TABLE lab_hardware ADD manufacturer_type TINYINT(4) COMMENT '供应厂商';
ALTER TABLE lab_notifyplan ADD execution_time datetime COMMENT '执行时间';
alter table lab_hardware modify column uniform_power varchar(100);
