<!--气瓶管理-详情-->
<template>
  <div class="addPage">
    <div class="addPage_title">
      <p>气瓶详情</p>
      <p  class="reset-button-one" @click="backPage">返回</p>
    </div>
     <!--基本信息-->
    <div class="info"   v-if="form.bottleStorage">
      <div class="info_l">
        <img src="@/assets/ZDimages/gasManage3_0/icon_qp.png">
        <p>{{form.bottleStorage.storageStatus == 1?'闲置':(form.bottleStorage.storageStatus == 2?'使用':(form.bottleStorage.storageStatus == 3?'出库':''))}}</p>
      </div>
      <div class="info_r">
        <li><i>识别码：</i><i>{{form.bottleStorage.electronicTag}}</i></li>
        <li><i>气瓶编号：</i><i>{{form.bottleStorage.airNumber}}</i></li>
        <li><i>气体名称：</i><i>{{form.bottleStorage.airName}}</i></li>
        <li><i>气瓶规格：</i><i>{{form.bottleStorage.configName}}</i></li>
        <li><i>最低气压值：</i><i>{{form.bottleStorage.minPressure}}Mpa</i></li>
        <li><i>气体组分：</i><i>{{form.bottleStorage.airComponent}}</i></li>
      </div>
    </div>
    <div class="addPage_b">
      <!--审核记录-->
      <div  class="addPage_b_t">
        <div class="addPage_b_t_title">使用人</div>
        <el-table border v-loading="loading" :data="form.list">
          <el-table-column label="实验人" align="left" prop="contacts"/>
          <el-table-column label="联系方式" align="left" prop="phone"></el-table-column>
          <el-table-column label="使用次数" align="left" prop="countNumber"></el-table-column>
          <el-table-column label="总使用量" align="left" prop="amount">
            <template slot-scope="scope">
              <span>{{scope.row.amount}}Mpa</span>
            </template>
          </el-table-column>
          <el-table-column label="最后使用时间" align="left" prop="useTime"></el-table-column>
        </el-table>
      </div>
    </div>
  </div>
</template>
<script>

import { getToken } from "@/utils/auth";
import { gasManageInfo } from '@/api/gasManage3_0/gasManageSYD'
let Base64 = require('js-base64').Base64;
export default {
  name: "addPage",
  props:{
    pageData2: {},
  },
  data() {
    return {
      pageType:1,
      uploadImgUrl: window.location.href.split('://')[0]+'://' + process.env.VUE_APP_BASE_API + "/base/upload", // 上传的图片服务器地址
      headers: {
        Authorization: "Bearer " + getToken(),
      },

      loading:false,
      form:{
      },

      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize:20,
      },
      total:0,
      tableData:[{
        num:0,
      }],
    };
  },
  created() {

  },
  methods: {

    /* 详情 */
    getInfo(id){
      let _this=this;
      gasManageInfo(id).then( response => {
        let res=response.data;
        if(response.code==200){
          _this.form=res;
        }
      });

    },
    //返回
    backPage(){
      this.$parent.handleClick('','','back');
    },

  },
  mounted() {
    console.log(this.pageData2.id)
    this.getInfo(this.pageData2.id);
  }

};
</script>

<style scoped lang="scss">
.addPage {
  flex:1;
  display: flex!important;
  flex-direction: column;
  box-shadow: 0 0 8px 2px rgba(0, 0, 0, 0.1);
  border-radius:10px;
  /*顶部*/
  .addPage_title{
    display: flex;
    justify-content: space-between;
    align-items: center;
    border-bottom: 1px solid #E0E0E0;
    padding-top:20px;
    p:nth-child(1){
      flex: 1;
      line-height:60px;
      color: #0045AF;
      font-size:18px;
      margin:0 12px 0 20px;
    }
    p:nth-child(2){
      margin-right:20px;
    }
    p:nth-child(3){
      margin-right:20px;
    }
  }
  /*基本信息*/
  .info{
    display: flex;
    justify-content: flex-start;
    flex-wrap: wrap;
    margin: 20px;
    box-sizing: border-box;
    .info_l{
      margin-right: 92px;
      width: 100px;
      text-align: center;
      margin-left: 100px;
      >img{
        width: 38px;
        height: 80px;
      }
      >P{
        font-size: 16px;
        font-family: Microsoft YaHei;
        font-weight: 400;
        color: #0183FA;
        line-height: 16px;
        margin-top: 12px;
      }
    }
    .info_r{
      display: flex;
      flex: 1;
      justify-content: flex-start;
      flex-wrap: wrap;
      >li{
        list-style-type: none;
        margin: 20px 0;
        >i{
          font-style: normal;
          display: inline-block;
          vertical-align:text-top;
        }
        >i:nth-of-type(1){
          font-size: 16px;
          font-family: Microsoft YaHei;
          font-weight: 400;
          color: #999999;
          line-height: 16px;
          width: 120px;
          text-align: right;
        }
        >i:nth-of-type(2){
          font-size: 16px;
          font-family: Microsoft YaHei;
          font-weight: 400;
          color: #333333;
          line-height: 16px;
          width: 200px;
          text-align: left;

        }
      }
    }

    .look_img{
      >i:nth-of-type(2){
        color: #0183FA;
      }
    }
  }
  .addPage_b{
    flex:1;
    display: flex!important;
    flex-direction: column;
    /*气瓶信息*/
    .addPage_b_t{
      flex:1;
      display: flex!important;
      flex-direction: column;
      padding: 0 20px;
      box-sizing: border-box;
      .addPage_b_t_title{
        font-size: 16px;
        font-family: Microsoft YaHei;
        font-weight: bold;
        color: #333333;
        line-height: 16px;
        margin: 40px 0 30px 0;
      }
    }
  }

}
</style>
