<!-- 检查和自查列表 -->
<template>
	<view class="snapshotList">
		<scroll-view scroll-y @scrolltolower="scrollGet" class="info-max-box">
			<view class="title" @click="planClick()">
				<view class="title-l">
					<view class="title-l-t">{{optionData.planTitle}}</view>
					<view class="title-l-b">
						<view v-if="optionData.checkCategory">
							{{optionData.checkCategory==1?'校院巡查':(optionData.checkCategory==2?'学院自查':'')}}
						</view>
						<view v-if="optionData.checkTypeName">{{optionData.checkTypeName}}</view>
						<view v-if="optionData.crossCheck==1">交叉互检</view>
					</view>
				</view>
				<img class="title-r" src="@/pages_safetyCheck/images/icon_wd_gd@1x.png">
			</view>
			<view class="tabTitleTow">
				<view :class="tabIndexTow==index?'tab-C':'tab-D'" v-for="(item,index) in tabListTow"
					@click="tabClickTow(index)">{{item}}</view>
			</view>
			<view>
				<view class="srearch">
					<picker @change="deptChange" :value="deptData.index" :range="deptData.list" :range-key="'deptName'">
						<view class="college">
							<view>{{deptData.name?deptData.name:'学院'}}</view>
							<img src="@/pages_safetyCheck/images/icon_06.png">
						</view>
					</picker>
					<view class="srearch-n">
						<view class="srearch-l">
							<img src="@/pages_safetyCheck/images/icon_aqjc_ss.png">
						</view>
						<input class="srearch-c" type="text" @confirm="carriageReturnRequest" v-model="searchValue"
							placeholder="实验室/房间号" />
						<view class="srearch-r" @click="saoCode()">
							<img src="@/pages_safetyCheck/images/icon_aqjc_sm.png">
						</view>
					</view>
				</view>
				<view class="level">
					<view class="level-li" :id="levelId==item.levelId?'levelColor-A':'levelColor-B'"
						@click="levelClick(item.levelId)" v-for="(item,index) in levelList">{{item.levelName}}</view>
				</view>
			</view>
			<view class="hidden">
				<view class="hidden-li" @click="listClick(item)" v-for="(item,index) in dataList">
					<img class="hidden-li-l" src="@/pages_safetyCheck/images/icon_sys_xz@1x.png">
					<view class="hidden-li-c">{{item.subName}}</view>
					<view class="hidden-li-r" :class="item.manageStatus == 2?'manageClass':''" v-if="tabIndexTow==0">
						{{item.manageStatus == 2?'已检查':'待检查'+item.unCheckCount+'项'}}
						<img v-if="item.manageStatus != 2" src="@/pages_safetyCheck/images/icon_ssp_gd@1x.png">
						<img v-if="item.manageStatus == 2" src="@/pages_safetyCheck/images/icon_wd_gd@1x.png">
					</view>
					<view class="hidden-li-r" :class="item.manageStatus == 2?'manageClass':''" v-if="tabIndexTow==1">
						{{item.overCheck?'已复查':'待复查'+item.stayExamineCheckNum+'项'}}
						<img src="@/pages_safetyCheck/images/icon_ssp_gd@1x.png">
					</view>
					<view class="hidden-li-r" :class="item.manageStatus == 2?'manageClass':''" v-if="tabIndexTow==2">
						{{item.overCheck?'已整改':'待整改'+item.stayExamineCheckNum+'项'}}
						<img src="@/pages_safetyCheck/images/icon_ssp_gd@1x.png">
					</view>
				</view>
				<!-- <view class="get-data-p" v-if="!getDataType">
					<img class="get-data-img" src="@/pages_safetyCheck/images/icon_aqjc_sl.png">
					<view class="get-data-text">上拉加载</view>
				</view> -->
				<view class="get-data-null-p" v-if="getDataType">- 没有更多数据 -</view>
			</view>
		</scroll-view>
	</view>
</template>

<script>
	import {
		config
	} from '@/api/request/config.js'
	import {
		systemDeptDropList,
	} from '@/pages/api/index.js'
	import {
		laboratorySubRelInfoGetRelList,
		laboratoryLevelConfigGetWebLevelTitleList,
		securityAppCheckManageList,
		securityAppCheckDangerGetCheckDangerSubList,
		securityAppCheckDangerReviewSubList,
	} from '@/pages_safetyCheck/api/index.js'
	export default {
		name: "snapshotList",
		components: {

		},
		data() {
			return {
				baseUrl: config.base_url,
				pageType: 0,
				userType: 1,
				tabListTow: ['检查任务', '复查验证', '隐患整改'],
				tabIndexTow: 0,
				//学院选择
				deptData: {
					index: null,
					list: [],
					id: null,
					name: null
				},
				deptIndex: null,
				deptList: [],
				//弹层实验室数据
				popupType: false,
				roomList: [],
				//级别
				levelList: [],
				levelId: null,
				optionData:null,
				//实验室/房间号
				searchValue: '',
				subId: '',
				planSetId: null,
				// 查询参数
				queryParams: {
					page: 1,
					pageSize: 20,
				},
				dataList: [],
				total: 0,
				getDataType: false,
			}
		},
		onLoad(option) {
			let optionData = JSON.parse(decodeURIComponent(option.infoData))
			console.log(optionData)
			uni.setNavigationBarTitle({
				title: optionData.checkPlanSetVoList.checkName
			})
			this.$set(this, 'tabListTow',
				optionData.checkCategory == 1 ? ['检查任务', '复查验证', '隐患整改'] :
				(optionData.checkCategory == 2 ? ['自查任务', '复查验证', '隐患整改'] : [])
			)
			this.$set(this, 'optionData', optionData);
			this.$set(this, 'planSetId', optionData.checkPlanSetVoList.planSetId);
		},
		created() {
			this.systemDeptDropList();
			this.laboratoryLevelConfigGetWebLevelTitleList();
		},
		mounted() {
			let self = this;
			setTimeout(() => {
				self.getList();
			}, 100);
		},
		methods: {
			//滚动事件
			scrollGet() {
				let self = this;
				if (self.total / self.queryParams.pageSize <= self.queryParams.page) {
					this.$set(this, 'getDataType', true);
				} else {
					this.queryParams.page += 1;
					this.$nextTick(() => {
						this.getList();
					})
				}
			},
			//级别切换
			levelClick(id) {
				if (this.levelId == id) {
					this.$set(this, 'levelId', null);
				} else {
					this.$set(this, 'levelId', id);
				}
				this.$set(this, 'getDataType', false);
				this.$set(this.queryParams, 'page', 1);
				this.getList();
			},
			//查询类型切换
			tabClickTow(index) {
				this.$set(this.queryParams, 'page', 1);
				this.$set(this, 'deptData', {
					index: null,
					list: this.deptData.list,
					id: null,
					name: null
				});
				this.$set(this, 'searchValue', null);
				this.$set(this, 'levelId', null);
				this.$set(this, 'getDataType', false);
				this.$set(this, 'dataList', []);
				this.$set(this, 'total', 0);
				this.$set(this, 'tabIndexTow', index);
				this.$nextTick(() => {
					this.getList();
				})
			},
			//计划详情
			planClick() {
				let infoData = {
					planId: this.optionData.planId
				};
				uni.navigateTo({
					url: '/pages_safetyCheck/views/planDetail?infoData=' + encodeURIComponent(JSON.stringify(
						infoData))
				});
			},
			//实验室列表数据选择
			listClick(row) {
				let infoData = row;
				infoData.pageType = this.tabIndexTow;
				infoData.planTitle = this.optionData.planTitle;
				infoData.checkCategory = this.optionData.checkCategory;
				infoData.checkTypeName = this.optionData.checkTypeName;
				infoData.crossCheck = this.optionData.crossCheck;
				infoData.checkPlanSetVoList = this.optionData.checkPlanSetVoList;
				uni.navigateTo({
					url: '/pages_safetyCheck/views/itemsManage/hiddenDangerItems?infoData=' + encodeURIComponent(
						JSON.stringify(infoData))
				});
			},
			//搜索房间接口
			async buildBySub() {
				let self = this;
				const {
					data
				} = await laboratorySubRelInfoGetRelList({
					'searchValue': this.form.searchValue,
				});
				if (data.code == 200) {
					if (data.data[0]) {
						this.roomList = data.data;
					} else {
						uni.showToast({
							title: '未找到相关实验室',
							icon: "none",
							mask: true,
							duration: 2000
						});
					}
				}
			},
			/******调用摄像头******/
			saoCode() {
				let self = this;
				uni.scanCode({
					onlyFromCamera: true,
					success: function(res) {
						let list = res.result.split("?")[1].split("&");
						let codeData = {};
						list.forEach((item) => {
							codeData[item.split("=")[0]] = item.split("=")[1];
						})
						if (codeData.code) {
							self.saoList(codeData.subId);
						} else {
							uni.showToast({
								title: '请扫描正确的二维码',
								icon: "none",
								mask: true,
								duration: 2000
							});
						}
					}
				});
			},
			//扫一扫查询数据
			async saoList(subId) {
				let obj = {
					planSetId: this.planSetId,
					subId: subId,
				}
				if (this.tabIndexTow == 0) {
					//检查计划
					const {
						data
					} = await securityAppCheckManageList(obj);
					if (data.code == 200) {
						if (data.data.records[0]) {
							//跳转检查项列表页面
							let infoData = data.data.records[0];
							infoData.pageType = this.tabIndexTow;
							infoData.checkPlanSetVoList = this.optionData.checkPlanSetVoList;
							uni.navigateTo({
								url: '/pages_safetyCheck/views/itemsManage/hiddenDangerItems?infoData=' +
									encodeURIComponent(
										JSON.stringify(infoData))
							});
						} else {
							//未找到数据提示
							uni.showToast({
								title: '未找到该实验室与本计划批次关联的数据',
								icon: "none",
								mask: true,
								duration: 2000
							});
						}
					}
				} else if (this.tabIndexTow == 1) {
					//复查计划
					obj.planId = this.optionData.planId;
					const {
						data
					} = await securityAppCheckDangerReviewSubList(obj);
					if (data.code == 200) {
						if (data.data.records[0]) {
							//跳转检查项列表页面
							let infoData = data.data.records[0];
							infoData.pageType = this.tabIndexTow;
							infoData.checkPlanSetVoList = this.optionData.checkPlanSetVoList;
							uni.navigateTo({
								url: '/pages_safetyCheck/views/itemsManage/hiddenDangerItems?infoData=' +
									encodeURIComponent(
										JSON.stringify(infoData))
							});
						} else {
							//未找到数据提示
							uni.showToast({
								title: '未找到该实验室与本计划批次关联的数据',
								icon: "none",
								mask: true,
								duration: 2000
							});
						}
					}
				} else if (this.tabIndexTow == 2) {
					//整改计划
					obj.planId = this.optionData.planId;
					const {
						data
					} = await securityAppCheckDangerGetCheckDangerSubList(obj);
					if (data.code == 200) {
						if (data.data.records[0]) {
							//跳转检查项列表页面
							let infoData = data.data.records[0];
							infoData.pageType = this.tabIndexTow;
							infoData.checkPlanSetVoList = this.optionData.checkPlanSetVoList;
							uni.navigateTo({
								url: '/pages_safetyCheck/views/itemsManage/hiddenDangerItems?infoData=' +
									encodeURIComponent(
										JSON.stringify(infoData))
							});
						} else {
							//未找到数据提示
							uni.showToast({
								title: '未找到该实验室与本计划批次关联的数据',
								icon: "none",
								mask: true,
								duration: 2000
							});
						}
					}
				}
			},
			//学院选择
			deptChange(e) {
				let self = this;
				self.deptData.list.forEach(function(item, index) {
					if (index == e.detail.value) {
						if (!item.deptId) {
							self.$set(self.deptData, 'id', null)
							self.$set(self.deptData, 'name', null)
						} else {
							self.$set(self.deptData, 'id', item.deptId)
							self.$set(self.deptData, 'name', item.deptName)
						}
					}
				})
				this.$set(this, 'getDataType', false);
				this.$set(this.queryParams, 'page', 1);
				this.getList();
			},
			//获取院系
			async systemDeptDropList() {
				const {
					data
				} = await systemDeptDropList({
					deptName: '',
					level: 2,
					deptType: 1
				});
				if (data.code == 200) {
					data.data.unshift({
						deptid: null,
						deptName: '全部'
					})
					this.$set(this.deptData, 'list', data.data);
				}
			},
			//获取分级
			async laboratoryLevelConfigGetWebLevelTitleList() {
				const {
					data
				} = await laboratoryLevelConfigGetWebLevelTitleList({});
				if (data.code == 200) {
					data.data.forEach(function(item){
						item.levelName=item.levelName.split('/')[0]
					})
					this.$set(this, 'levelList', data.data);
				}
			},
			//回车触发
			carriageReturnRequest() {
				this.$set(this, 'getDataType', false);
				this.$set(this.queryParams, 'page', 1);
				this.getList();
			},
			//检查任务
			async getList() {
				let self = this;
				let obj = JSON.parse(JSON.stringify(this.queryParams));
				obj.planSetId = this.planSetId;
				obj.deptId = this.deptData.id ? this.deptData.id : '';
				obj.searchValue = this.searchValue ? this.searchValue : '';
				obj.levelId = this.levelId ? this.levelId : '';
				if (this.tabIndexTow == 0) {
					//检查计划
					const {
						data
					} = await securityAppCheckManageList(obj);
					if (data.code == 200) {
						if (self.queryParams.page == 1) {
							this.dataList = data.data.records;
							this.total = data.data.total;
							if (data.data.total / self.queryParams.pageSize <= self.queryParams.page) {
								this.$set(this, 'getDataType', true);
							}
						} else {
							this.dataList = [...this.dataList, ...data.data.records]
							this.total = data.data.total;
							if (data.data.total / self.queryParams.pageSize <= self.queryParams.page) {
								this.$set(this, 'getDataType', true);
							}
						}
					}
				} else if (this.tabIndexTow == 1) {
					//复查计划
					obj.planId = this.optionData.planId;
					const {
						data
					} = await securityAppCheckDangerReviewSubList(obj);
					if (data.code == 200) {
						this.dataList = data.data;
						this.$set(this, 'getDataType', true);
						// 后台接口暂时不支持分页
						// if (self.queryParams.page == 1) {
						// 	this.dataList = data.data.records;
						// 	this.total = data.data.total;
						// 	if (data.data.total / self.queryParams.pageSize <= self.queryParams.page) {
						// 		this.$set(this, 'getDataType', true);
						// 	}
						// } else {
						// 	this.dataList = [...this.dataList, ...data.data.records]
						// 	this.total = data.data.total;
						// 	if (data.data.total / self.queryParams.pageSize <= self.queryParams.page) {
						// 		this.$set(this, 'getDataType', true);
						// 	}
						// }
					}

				} else if (this.tabIndexTow == 2) {
					//整改计划
					obj.planId = this.optionData.planId;
					const {
						data
					} = await securityAppCheckDangerGetCheckDangerSubList(obj);
					if (data.code == 200) {
						this.dataList = data.data;
						this.$set(this, 'getDataType', true);
						// 后台接口暂时不支持分页
						// if (self.queryParams.page == 1) {
						// 	this.dataList = data.data.records;
						// 	this.total = data.data.total;
						// 	if (data.data.total / self.queryParams.pageSize <= self.queryParams.page) {
						// 		this.$set(this, 'getDataType', true);
						// 	}
						// } else {
						// 	this.dataList = [...this.dataList, ...data.data.records]
						// 	this.total = data.data.total;
						// 	if (data.data.total / self.queryParams.pageSize <= self.queryParams.page) {
						// 		this.$set(this, 'getDataType', true);
						// 	}
						// }
					}

				}
			},




		}
	}
</script>

<style lang="stylus" scoped>
	.snapshotList {
		height: 100%;
		display flex;
		overflow: hidden;

		.info-max-box {
			padding-top: 20rpx;
		}

		.title {
			width: 690rpx;
			margin: 0 30rpx 20rpx;
			height: 150rpx;
			background: #FFFFFF;
			border-radius: 20rpx 20rpx 20rpx 20rpx;
			display: flex;
			justify-content: space-between;
			align-items: center;
			padding: 0 30rpx;
			box-sizing: border-box;

			.title-l {
				width: 594rpx;

				.title-l-t {
					font-size: 30rpx;
					color: #333333;
					line-height: 42rpx;
					text-align: left;
					overflow: hidden;
					text-overflow: ellipsis;
					white-space: nowrap;
				}

				.title-l-b {
					display: flex;
					justify-content: flex-start;
					margin-top: 16rpx;

					>view {
						width: 130rpx;
						height: 50rpx;
						background: rgba(1, 131, 250, 0.2);
						border-radius: 6rpx 6rpx 6rpx 6rpx;
						font-size: 24rpx;
						color: #0183FA;
						line-height: 50rpx;
						text-align: center;
						margin-right: 14rpx;
					}
				}
			}

			.title-r {
				width: 24rpx;
				height: 24rpx;
			}
		}

		.tabTitleTow {
			width: 690rpx;
			height: 80rpx;
			display: flex;
			justify-content: center;
			margin: 20rpx 0 0 30rpx;

			>view:nth-of-type(1) {
				width: 230rpx;
				height: 80rpx;
				border-radius: 50rpx 0rpx 0rpx 50rpx;
			}

			>view:nth-of-type(2) {
				width: 230rpx;
				height: 80rpx;
				border-radius: 0rpx 0rpx 0rpx 0rpx;
			}

			>view:nth-of-type(3) {
				width: 230rpx;
				height: 80rpx;
				border-radius: 0rpx 50rpx 50rpx 0rpx;
			}

			.tab-C {
				font-size: 30rpx;
				color: #FFFFFF;
				line-height: 80rpx;
				text-align: center;
				background: #0183FA;
			}

			.tab-D {
				font-size: 30rpx;
				color: #333333;
				line-height: 80rpx;
				text-align: center;
				background: #FFFFFF;
			}
		}

		.srearch {
			width: 750rpx;
			height: 100rpx;
			background: #FFFFFF;
			border-radius: 0rpx 0rpx 0rpx 0rpx;
			overflow: hidden;
			margin-top: 20rpx;
			display: flex;
			display: flex;
			justify-content: space-between;
			align-items: center;
			padding: 0 30rpx;
			box-sizing: border-box;

			.college {
				width: 200rpx;
				height: 60rpx;
				border-radius: 50rpx 50rpx 50rpx 50rpx;
				border: 1rpx solid #E0E0E0;
				font-size: 24rpx;
				color: #333333;
				line-height: 60rpx;
				text-align: left;
				display: flex;
				justify-content: space-between;
				align-items: center;
				padding: 0 26rpx;
				box-sizing: border-box;
				overflow: hidden;
				text-overflow: ellipsis;
				white-space: nowrap;

				>view {
					width: 124rpx;
					display: block;
					overflow: hidden;
					text-overflow: ellipsis;
					white-space: nowrap;
				}

				>img {
					display: block;
					width: 24rpx;
					height: 12rpx;
				}
			}

			.srearch-n {
				width: 480rpx;
				height: 60rpx;
				border-radius: 50rpx 50rpx 50rpx 50rpx;
				border: 1rpx solid #E0E0E0;
				display: flex;
				justify-content: flex-start;
				align-items: center;

				.srearch-l {
					width: 60rpx;
					height: 60rpx;

					>img {
						width: 20rpx;
						height: 20rpx;
						margin: 20rpx 0 0 26rpx;
					}
				}

				.srearch-c {
					flex: 1;
					height: 58rpx;
					font-size: 24rpx;
					color: #999999;
					line-height: 30rpx;
					text-align: left;
				}

				.srearch-r {
					width: 90rpx;
					height: 60rpx;

					>img {
						width: 30rpx;
						height: 30rpx;
						margin: 14rpx 22rpx 0 30rpx;
					}


				}
			}
		}

		.level {
			width: 750rpx;
			height: 80rpx;
			background: #FFFFFF;
			display: flex;
			justify-content: flex-start;
			padding: 0 30rpx;
			box-sizing: border-box;

			.level-li {
				width: 100rpx;
				height: 50rpx;
				background: #F5F5F5;
				border-radius: 50rpx 50rpx 50rpx 50rpx;
				border: 1rpx solid #E0E0E0;
				margin-right: 10rpx;
				font-size: 24rpx;
				color: #333333;
				line-height: 50rpx;
				text-align: center;
			}

			#levelColor-A {
				background: rgba(255, 0, 0, 0.2);
				color: #FF0000;
				border: 1rpx solid #FF0000;
			}

			#levelColor-B {
				background: #F5F5F5;
				color: #333333;
				border: 1rpx solid #E0E0E0;
			}

		}

		.list {
			width: 690rpx;
			min-height: 765rpx;
			background: #FFFFFF;
			border-radius: 20rpx 20rpx 20rpx 20rpx;
			margin: 20rpx 0 0 30rpx;

			.list-li {
				display: flex;
				justify-content: space-between;
				border-bottom: 1rpx solid #E0E0E0;
				padding: 0 22rpx 0 28rpx;
				box-sizing: border-box;

				>view:nth-of-type(1) {
					font-size: 30rpx;
					color: #333333;
					line-height: 80rpx;
					text-align: left;
				}

				>view:nth-of-type(2) {
					font-size: 28rpx;
					color: #666666;
					line-height: 80rpx;
					text-align: left;
					display: flex;
					justify-content: flex-start;
					align-items: center;

					>img {
						width: 24rpx;
						height: 24rpx;
						margin-left: 8rpx;
					}
				}

				.project_r {
					width: 510rpx;
					min-height: 80rpx;
					display: flex;
					justify-content: flex-end;
					align-items: center;
					padding-left: 20rpx;
					box-sizing: border-box;
					color: #666;
				}

			}

			.describe {
				width: 636rpx;
				height: 120rpx;
				border-radius: 10rpx 10rpx 10rpx 10rpx;
				border: 1rpx solid #E0E0E0;
				margin: 20rpx 0 0 28rpx;
				padding: 12rpx 16rpx;
				box-sizing: border-box;
			}

			.check-for-img-max-box {
				margin: 20px 28rpx;

				.left-title-p {
					width: 100%;
					text-align: left;
					font-size: 30rpx;
					font-family: PingFang SC-Medium, PingFang SC;
					font-weight: 400;
					color: #333333;
					line-height: 80rpx;
				}

				.right-img-box {
					.img-box {
						display inline-block;
						height: 150rpx;
						width: 150rpx;
						position relative;
						margin: 0 14rpx 20rpx 0;
						border-radius 10rpx;
						overflow hidden;

						.img-data {
							height: 150rpx;
							width: 150rpx;
						}

						.position-img {
							position absolute;
							right: 0;
							top: 0;
							width: 36rpx;
							height: 36rpx;
						}
					}

					.img-box:nth-of-type(3n+3) {
						margin-right: 0rpx;
					}

					.add-button {
						margin: 0 0rpx 20rpx 0;
						border-radius 10rpx;
						overflow hidden;
						display inline-block;
						height: 150rpx;
						width: 150rpx;
					}
				}
			}
		}

		/* 隐患整改 */
		.hidden {
			box-sizing: border-box;
			margin: 20rpx 0;

			.hidden-li:nth-child(1) {
				border-top: none;
			}

			.hidden-li {
				padding: 0 30rpx;
				height: 80rpx;
				background: #FFFFFF;
				border-top: 1rpx solid #E0E0E0;
				display: flex;
				justify-content: flex-start;
				align-items: center;

				.hidden-li-l {
					width: 34rpx;
					height: 34rpx;
				}

				.hidden-li-c {
					font-size: 28rpx;
					color: #333333;
					line-height: 30rpx;
					text-align: left;
					flex: 1;
					overflow: hidden;
					text-overflow: ellipsis;
					white-space: nowrap;
					margin: 0 84rpx 0 12rpx;
				}

				.hidden-li-r {
					font-size: 28rpx;
					color: #0183FA;
					line-height: 80rpx;
					text-align: left;
					display: flex;
					justify-content: flex-start;
					align-items: center;

					>img {
						width: 24rpx;
						height: 24rpx;
					}
				}

				.manageClass {
					color: #009c1f !important;
				}
			}

			.hidden-li:last-of-type {
				border: none;
			}

			.get-data-p {
				height: 100rpx;
				text-align: center;

				.get-data-img {
					width: 30rpx;
					height: 30rpx;
					margin: 0 auto;
					margin-top: 15rpx;
				}

				.get-data-text {
					text-align: center;
				}
			}

			.get-data-null-p {
				height: 100rpx;
				line-height: 100rpx;
				text-align: center;
			}
		}

		#color-A {
			color: #0183FA;
		}

		#color-B {
			color: #FF8C00;
		}

		#color-C {
			color: #16B531;
		}
	}
</style>
